-40 -20 0 20 40 60

0

100

200

300

bright star Zenith angle

Zenith

Flex parabola (dashes):

11.43 + (3.48 + 0.04716*DEC)*DEC

NO-flex parabola (dashes):

35.09 + (2.793 + 0.04202*DEC)*DEC